import { Stack } from 'expo-router';

export default function Layout() {
  return (
    <Stack
      screenOptions={{
        headerShown: true,
      }}>
      <Stack.Screen name="index" options={{title: '测量'}}/>
      <Stack.Screen name="save" options={{title: '测量参数设置'}}/>
    </Stack>
  );
}
